=== HTTP code : 200 ===

HTTP/1.1 200 OK
Server: nginx/1.4.6 (Ubuntu)
Date: Mon, 06 Apr 2015 22:59:00 GMT
Content-Type: image/jpeg
Content-Length: 109304
Connection: close
X-Powered-By: PHP/5.5.9-1ubuntu4.7
Cache-Control: private, max-age=604800
Expires: Mon, 13 Apr 2015 22:59:00 GMT


Link is valid.