a:6:{s:5:"width";i:320;s:6:"height";i:231;s:14:"hwstring_small";s:23:"height='92' width='128'";s:4:"file";s:35:"2012/06/Rancho-Cucamonga-campus.jpg";s:10:"image_meta";a:11:{s:8:"aperture";d:14;s:6:"credit";s:0:"";s:6:"camera";s:9:"NIKON D1X";s:7:"caption";s:841:"File Name : DSC_5029.TIF
 File Size : 17.0MB (17774350 bytes)
 Date Taken : Mon, Nov 25, 2002 9:17:01 AM
 Image Size : 3008 x 1960 pixels
 Resolution : 300 x 300 dpi
 Bit Depth : 8 bits/channel
 Protection Attribute : Off
 Camera ID : N/A
 Camera : NIKON D1X
 Quality Mode : HI (RGB Uncompressed)
 Metering Mode : Matrix
 Exposure Mode : Programmed Auto
 Speed Light : No
 Focal Length : 15.0 mm
 Shutter Speed : 1/80 seconds
 Aperture : F14.0
 Exposure Compensation : 0.0 EV
 White Balance : Direct Sunlight
 Lens : 15-31 mm F3.5-F4.5
 Flash Sync Mode : N/A
 Exposure Difference : 0.0 EV
 Flexible Program : Yes
 Sensitivity : ISO200
 Sharpening : Normal
 Image Type : Color
 Color Mode : Mode I (sRGB)
 Hue Adjustment : 0
 Saturation Control : N/A
 Tone Compensation : Normal
 Latitude(GPS) : N/A
 Longitude(GPS) : N/A
 Altitude(GPS) : N/A";s:17:"created_timestamp";i:1038215821;s:9:"copyright";s:0:"";s:12:"focal_length";s:2:"15";s:3:"iso";i:0;s:13:"shutter_speed";s:6:"0.0125";s:5:"title";s:0:"";s:11:"orientation";i:1;}s:10:"wp_smushit";s:29:"Reduced by 2.3% (2.1&nbsp;KB)";}