=== HTTP code : 200 ===

HTTP/1.1 200 OK
Server: nginx/1.4.6 (Ubuntu)
Date: Wed, 08 Apr 2015 09:59:20 GMT
Content-Type: image/jpeg
Content-Length: 14555
Connection: close
X-Powered-By: PHP/5.5.9-1ubuntu4.7
Cache-Control: private, max-age=604800
Expires: Wed, 15 Apr 2015 09:59:20 GMT


Link is valid.