=== HTTP code : 200 ===

HTTP/1.1 301 Moved Permanently
Server: nginx/1.4.6 (Ubuntu)
Date: Wed, 08 Apr 2015 04:00:56 GMT
Content-Type: text/html
Content-Length: 193
Location: http://consumerinfo.sjvc.edu/modesto/medical-assisting-degree/
Connection: close

HTTP/1.1 200 OK
Server: nginx/1.4.6 (Ubuntu)
Date: Wed, 08 Apr 2015 04:00:56 GMT
Content-Type: text/html; charset=UTF-8
Content-Length: 41283
Last-Modified: Tue, 20 Jan 2015 23:54:09 GMT
Connection: close
Vary: Accept-Encoding
ETag: "54beeaa1-a143"
Accept-Ranges: bytes


Link is valid.